(GeV) Tp 210^310

HFS spectrum/PFS spectrum

0.85

0.9

0.95

1

1.05

1.1

1.15

Comparison of Hadronization Effects for Different Jet Algorithms in Pythia Tune DWT

=1.0 ktD =0.6 ktD = 0.7

SISCone R = 0.7

MidPointCone R = 0.7

Cambridge D